<img class="alignleft size-large wp-image-2462" src="https://www.xerotta.com/cms/wp-content/uploads/2021/04/285ad5b6b50d16ac0d0bca67c9e8953a-1024x576.png" alt="" width="1024" height="576" />

<span style="vertical-align: inherit;"><span style="vertical-align: inherit;">There are no people with fever or poor physical condition.</span></span>
<p style="text-align: right;"><span style="display: inline !important; float: none; background-color: #ffffff; color: #1a1a1a; font-family: 'Noto Sans JP'; font-size: 100%; font-style: normal; font-variant: normal; font-weight: 400; letter-spacing: normal; orphans: 2; text-align: right; text-decoration: none; text-indent: 0px; text-transform: none; -webkit-text-stroke-width: 0px; white-space: normal; word-spacing: 0px;"><span style="vertical-align: inherit;"><span style="vertical-align: inherit;">Xerotta </span></span></span><span class="s1"><span style="vertical-align: inherit;"><span style="vertical-align: inherit;">Co., Ltd. Public Relations</span></span></span></p>
&nbsp;